\begin{table}[h]
\centering
\caption{Summary Statistics of Quantum Entanglement Measurements}
\label{tab:summary}
\begin{tabular}{lr}
\toprule
\textbf{Metric} & \textbf{Value} \\
\midrule
Total Experiments & 33 \\
Participating Countries & 32 \\
Participating Institutions & 33 \\
Mean Bell Parameter (S) & 2.725 $\pm$ 0.068 \\
Mean Entanglement Fidelity & 0.9627 $\pm$ 0.0175 \\
Mean Visibility (\%) & 96.27 $\pm$ 1.75 \\
Bell Violations (\%) & 100.0 \\
High Fidelity ($>0.98$) (\%) & 21.2 \\
\bottomrule
\end{tabular}
\end{table}
